/*
  Warnings:

  - Changed the type of `country` on the `Heliport` table. No cast exists, the column would be dropped and recreated, which cannot be done if there is data, since the column is required.

*/
-- AlterTable
ALTER TABLE "Heliport" DROP COLUMN "country",
ADD COLUMN     "country" "Country" NOT NULL;
