-- AlterTable
ALTER TABLE "users" ALTER COLUMN "settings_mic_volume" SET DATA TYPE DOUBLE PRECISION,
ALTER COLUMN "settings_dme_volume" SET DATA TYPE DOUBLE PRECISION;
