import { prisma } from "@repo/db";
const fetchMainMessage = async () => {
	return await prisma.message.findFirst({
		where: {
			active: true,
			isMainMsg: true,
		},
	});
};

const mainMessage = await fetchMainMessage();

let msgColor;
switch (mainMessage?.color) {
	case "WARNING":
		msgColor = "alert alert-warning ml-3";
		break;
	case "INFO":
		msgColor = "alert alert-info ml-3";
		break;
	case "SUCCESS":
		msgColor = "alert alert-success ml-3";
		break;
	case "ERROR":
		msgColor = "alert alert-error ml-3";
		break;
	default:
		msgColor = "alert ml-3";
}

export const WarningAlert = () => {
	if (mainMessage?.message == "" || !mainMessage) {
		return <></>;
	} else {
		return (
			<div role="alert" className={msgColor}>
				<svg
					xmlns="http://www.w3.org/2000/svg"
					className="h-6 w-6 shrink-0 stroke-current"
					fill="none"
					viewBox="0 0 24 24"
				>
					<path
						strokeLinecap="round"
						strokeLinejoin="round"
						strokeWidth="2"
						d="M12 9v2m0 4h.01m-6.938 4h13.856c1.54 0 2.502-1.667 1.732-3L13.732 4c-.77-1.333-2.694-1.333-3.464 0L3.34 16c-.77 1.333.192 3 1.732 3z"
					/>
				</svg>
				<span className="font-bold">{mainMessage?.message}</span>
			</div>
		);
	}
};

/* ACHTUNG! Wir führen am kommenden Samstag Wartungsarbeiten am Server
				durch, von 19:00 Uhr bis 19:30 Uhr wird das HUB nicht erreichbar sein. */
